compress = EXE:EX! COM:CO! SYS:SY! HLP:HL! HIX:HI! TXT:TX! WRI:WR!
;
;  POWERLan Utilities installation file
;

file = INSTALL.EXE : Please insert the "POWERLan Utilities" diskette

choice = Documentation

DOCS\PL3WFW.WRI                                           0b1   0x18     696192
DOCS\PL3NW.WRI                                            0b1   0x18     853888
DOCS\DRIVERS.TXT                                          0b1   0x18      65240

choice = Sample header and trailer files

SAMPLES\FORMFEED.TLA                                     0b10   0x00          8
SAMPLES\FORMFEED.TLR                                     0b10   0x00          2
SAMPLES\HP6LINES.HDA                                     0b10   0x00         84
SAMPLES\HP6LINES.HDR                                     0b10   0x00          7
SAMPLES\HP7LINES.HDA                                     0b10   0x00         84
SAMPLES\HP7LINES.HDR                                     0b10   0x00          7
SAMPLES\HP8LINES.HDA                                     0b10   0x00         84
SAMPLES\HP8LINES.HDR                                     0b10   0x00          7
SAMPLES\HPLAND10.HDA                                     0b10   0x00        131
SAMPLES\HPLAND10.HDR                                     0b10   0x00         13
SAMPLES\HPLAND16.HDA                                     0b10   0x00        229
SAMPLES\HPLAND16.HDR                                     0b10   0x00         27
SAMPLES\HPPORT10.HDA                                     0b10   0x00        128
SAMPLES\HPPORT10.HDR                                     0b10   0x00         13
SAMPLES\HPPORT16.HDA                                     0b10   0x00        228
SAMPLES\HPPORT16.HDR                                     0b10   0x00         27
SAMPLES\HPRESET.HDA                                      0b10   0x00         34
SAMPLES\HPRESET.HDR                                      0b10   0x00          2
SAMPLES\HPRESET.TLA                                      0b10   0x00         34
SAMPLES\HPRESET.TLR                                      0b10   0x00          2

choice = OS/2 Netbios

PTNB\NBSTATUS.EXE                                       0b100   0x08      18515
PTNB\PTARCNB.HLP                                        0b100   0x18       3706
PTNB\PTARCNB.SYS                                        0b100   0x08      83606
PTNB\PTARCNBA.EXE                                       0b100   0x08       8449
PTNB\PTARCNBE.EXE                                       0b100   0x08       2777
PTNB\PTNENB.HLP                                         0b100   0x18       2129
PTNB\PTNENB.SYS                                         0b100   0x08      85794
PTNB\PTNENBA.EXE                                        0b100   0x08       7779
PTNB\PTNENBE.EXE                                        0b100   0x08       2775
PTNB\PTWDNB.HLP                                         0b100   0x18       2201
PTNB\PTWDNB.SYS                                         0b100   0x08      85352
PTNB\PTWDNBA.EXE                                        0b100   0x08       7779
PTNB\PTWDNBE.EXE                                        0b100   0x08       2775

choice = Utilities

UTILS\BOOTTEST.EXE                                     0b1000   0x08      10558
UTILS\DATATEST.EXE                                     0b1000   0x08      10961
UTILS\DISKREAD.EXE                                     0b1000   0x08      30464
UTILS\DUMPNFIX.EXE                                     0b1000   0x08      23197
UTILS\FLIPFLOP.COM                                     0b1000   0x08         64
UTILS\INTTEST.EXE                                      0b1000   0x08      10020
UTILS\LOGON.EXE                                        0b1000   0x08      38301
UTILS\MSNDIS.ZIP                                       0b1000   0x00      13422
UTILS\NWTIME.EXE                                       0b1000   0x08      10877
UTILS\NWUSE.EXE                                        0b1000   0x08      17901
UTILS\NAMETEST.EXE                                     0b1000   0x08      12754
UTILS\NBPERF.EXE                                       0b1000   0x08      31235
UTILS\NETUSERS.EXE                                     0b1000   0x08      13711
UTILS\TESTPOST.EXE                                     0b1000   0x08       8648
UTILS\UNLINK.EXE                                       0b1000   0x08       6509

;                                                  Total file size =    2168730
;
